SinqHM Server #3

SinqHM Server #2

SinqHM Histogrammer

N e t w o r k

SinqHM Master

Filler

Histogram Storage & Status

Semaphores

SinqHM Server #1

PowerPC

Host(s) Client #3

Client #2

Client #1

Signals

Detector Data

Configuration and Control