\documentclass[a4paper]{book}
\usepackage{a4wide}
\usepackage{makeidx}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{multicol}
\usepackage{float}
\usepackage{textcomp}
\usepackage{alltt}
\usepackage{doxygen}
\makeindex
\setcounter{tocdepth}{1}
\renewcommand{\footrulewidth}{0.4pt}
\begin{document}
\begin{titlepage}
\vspace*{7cm}
\begin{center}
{\Large Reference Manual}\\
\vspace*{1cm}
{\large Generated by Doxygen 1.4.7}\\
\vspace*{0.5cm}
{\small Tue Dec 1 15:31:44 2009}\\
\end{center}
\end{titlepage}
\clearemptydoublepage
\pagenumbering{roman}
\tableofcontents
\clearemptydoublepage
\pagenumbering{arabic}
\chapter{Common C++ library for SLS detectors data acquisition }
\label{index}\input{index}
\chapter{Namespace Index}
\input{namespaces}
\chapter{Hierarchical Index}
\input{hierarchy}
\chapter{Class Index}
\input{annotated}
\chapter{File Index}
\input{files}
\chapter{Page Index}
\input{pages}
\chapter{Namespace Documentation}
\input{namespacestd}
\chapter{Class Documentation}
\input{structangleConversionConstant}
\include{classdetectorData}
\include{classeigerDetector}
\include{structiarray}
\include{classMySocketTCP}
\include{classmythenDetector}
\include{structROI}
\include{structsls__detector__channel}
\include{structsls__detector__chip}
\include{structsls__detector__module}
\include{classslsDetector}
\include{structslsDetector_1_1sharedSlsDetector}
\chapter{File Documentation}
\input{sls__detector__defs_8h}
\include{eigerDetector_8h}
\include{MySocketTCP_8cxx}
\include{MySocketTCP_8h}
\include{mythenDetector_8h}
\include{slsDetector_8cpp}
\include{slsDetector_8h}
\include{usersFunctions_8c}
\include{usersFunctions_8h}
\chapter{Page Documentation}
\input{bug}
\printindex
\end{document}
