\documentclass[a4paper]{book}
\usepackage{a4wide}
\usepackage{makeidx}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{multicol}
\usepackage{float}
\usepackage{textcomp}
\usepackage{alltt}
\usepackage{doxygen}
\makeindex
\setcounter{tocdepth}{1}
\renewcommand{\footrulewidth}{0.4pt}
\begin{document}
\begin{titlepage}
\vspace*{7cm}
\begin{center}
{\Large Reference Manual}\\
\vspace*{1cm}
{\large Generated by Doxygen 1.4.7}\\
\vspace*{0.5cm}
{\small Tue Mar 27 16:32:29 2012}\\
\end{center}
\end{titlepage}
\clearemptydoublepage
\pagenumbering{roman}
\tableofcontents
\clearemptydoublepage
\pagenumbering{arabic}
\chapter{Common Root library for SLS detectors data analysis }
\label{index}\input{index}
\chapter{Namespace Index}
\input{namespaces}
\chapter{Class Index}
\input{annotated}
\chapter{File Index}
\input{files}
\chapter{Namespace Documentation}
\input{namespacestd}
\chapter{Class Documentation}
\input{classenergyCalibration}
\include{classenergyCalibrationFunctions}
\chapter{File Documentation}
\input{energyCalibration_8h}
\printindex
\end{document}
