\doxysection{utils/src/logger.cpp File Reference}
\hypertarget{logger_8cpp}{}\label{logger_8cpp}\index{utils/src/logger.cpp@{utils/src/logger.cpp}}
{\ttfamily \#include \"{}aare/utils/logger.\+hpp\"{}}\newline
\doxysubsubsection*{Namespaces}
\begin{DoxyCompactItemize}
\item 
namespace \mbox{\hyperlink{namespaceaare}{aare}}
\begin{DoxyCompactList}\small\item\em \doxylink{classaare_1_1Frame}{Frame} class to represent a single frame of data model class should be able to work with streams coming from files or network. \end{DoxyCompactList}\item 
namespace \mbox{\hyperlink{namespaceaare_1_1logger}{aare\+::logger}}
\item 
namespace \mbox{\hyperlink{namespaceaare_1_1logger_1_1internal}{aare\+::logger\+::internal}}
\end{DoxyCompactItemize}
\doxysubsubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \mbox{\hyperlink{namespaceaare_1_1logger_a9615ab157fbc2bb3e9b2bfb65e12be8c}{aare\+::logger\+::set\+\_\+streams}} (std\+::streambuf \texorpdfstring{$\ast$}{*}out, std\+::streambuf \texorpdfstring{$\ast$}{*}err)
\item 
void \mbox{\hyperlink{namespaceaare_1_1logger_ab1dff5db561f3b7ebaee8428ab6d5b7d}{aare\+::logger\+::set\+\_\+streams}} (std\+::streambuf \texorpdfstring{$\ast$}{*}out)
\item 
void \mbox{\hyperlink{namespaceaare_1_1logger_a335576e89f0ac25831e1ff7abb3c67c8}{aare\+::logger\+::set\+\_\+verbosity}} (\mbox{\hyperlink{namespaceaare_1_1logger_af49e00b36677b44ea78813c109b697ed}{LOGGING\+\_\+\+LEVEL}} level)
\item 
\mbox{\hyperlink{classaare_1_1logger_1_1Logger}{Logger}} \& \mbox{\hyperlink{namespaceaare_1_1logger_adfa4e46d0e102fd5f1eb9a6471eead60}{aare\+::logger\+::get\+\_\+logger\+\_\+instance}} ()
\item 
void \mbox{\hyperlink{namespaceaare_1_1logger_a42089a21b600c9733ff5a82138c4f53d}{aare\+::logger\+::set\+\_\+output\+\_\+file}} (std\+::string filename)
\end{DoxyCompactItemize}
