=== Current versions

Current stable version is Pmodules 1.0.0.

Current development version is Pmodules 1.1.15.

=== News stable

See: https://gitlab.psi.ch/Pmodules/src/-/blob/Pmodules-1.0/CHANGELOG.md[CHANGELOG]

=== News development

See: https://gitlab.psi.ch/Pmodules/src/-/blob/master/CHANGELOG.md[CHANGELOG]

New features in development version:

* overlays
* collections
* ban a module on dedicated systems via a block-list

ToDo

* module configuration files in YAML format
* more testing
